 Run 59272 Evt 168524   rlcs2:R59272_E168524.PAD;1     17MAY94 14:52:35 14-FEB-96

                                                                        PHI:
                                                                        ETA:

                                                                               125.
                                                                               0.12

                                                                             272.4

                                DAIS E transverse Eta-Phi LEGO Plot
                                Max tower E= 272.4 Min tower E=  0.50  N clusters=
                                  METS: Etotal = 915.0 GeV,   Et(scalar)= 613.8 Ge
                                        Et(miss)=  24.6 at Phi= 197.7 Deg.

 Cluster Et_min   0.0 GeV
 Clusters:ETHAT CLUSTERING
 $CLP: Cone-size=?, Min Tower Et=?
 EM HA Nr   Et   Phi    Eta  DEta #Tow EM/Et Trks  Mass
         1 276.0 125.1  0.09  0.07   0 0.966    1   8.1
         2 253.6 315.5  0.69  0.66   0 0.974    3  10.4
         4  28.7 242.1  0.99  0.94   0 0.640    7   7.7
         3  23.1 282.3 -0.75 -0.75   0 0.793    4   5.7
         5   9.1 355.8 -0.95 -0.92   0 0.722    4   3.3

      CLF:  ETEM/ETTOT/ORG/NTW/PT
            13.5/ 21.0/CLF/  5
           127.0/136.0/CLF/  1
           127.0/133.5/CLF/  3
            12.0/ 14.5/CLF/  2