 Run 65085 Evt 273167   HJF_HIMETZS.PAD                20DEC94  9:08:32 31-MAY-95

   Pt   Phi   Eta
 -90.0  182 -0.23
  65.1  157  0.54
  -2.5  142 -1.08
   1.6  298 -1.38
  -1.5  278 -0.34
   1.5  239 -0.51
   1.2  190 -0.65
   1.1  119  1.19
  -1.0  311 -1.49
   1.0  143 -0.58
   0.9  128 -1.03
   0.8  226 -1.06
   0.8   93 -1.04
   0.7    0 -1.71
  -0.7  115 -0.76
  -0.6   86 -1.36
   0.6  210 -1.60
   0.6   26  0.25
   0.6  124  0.24
  -0.5  339 -0.88
  -0.5    5 -1.29
  -0.5  110 -1.07
   0.4  276  1.15
   0.4  317 -1.26
  -0.4  144  0.32
   0.4   27  1.60
  -0.4   43  0.66
  -0.4  187  0.56
   0.3  159 -1.80
  -0.3   47  0.21
  -0.3  243 -0.91
   0.3  295  0.45
  -0.3  229  0.00
   0.3  251 -0.71
  4 more trks...
 hit & to display PHI:

                                                                        ETA:

                                                                               182.

                                                                              -0.23

                                                              Emax =  255.1 GeV

                   Et(METS)=  15.7 GeV

                   /
                       Phi = 186.9 Deg
                    Sum Et = 460.8 GeV