 Run 65085 Evt 273167   HJF_HIMETZS.PAD                20DEC94  9:08:32 31-MAY-95

                                                                        PHI:
                                                                        ETA:

                                                                               291.
                                                                              -0.23

                                                                             203.7

                                DAIS E transverse Eta-Phi LEGO Plot
                                Max tower E= 203.7 Min tower E=  0.50  N clusters=
                                  METS: Etotal = 850.7 GeV,   Et(scalar)= 460.8 Ge
                                        Et(miss)=  15.7 at Phi= 186.9 Deg.

 Cluster Et_min   0.0 GeV
 Clusters:ETHAT CLUSTERING
 $CLP: Cone-size=?, Min Tower Et=?
 EM HA Nr   Et   Phi    Eta  DEta #Tow EM/Et Trks  Mass
         5 211.9 353.4  0.65  0.78   0 0.932    1  16.4
         2 114.1 182.6 -0.23 -0.07   0 0.971    2   8.2
         3  88.2 157.2  0.53  0.67   0 0.968    1   4.1
         8   8.4 254.4 -0.49 -0.32   0 0.877    2   2.8
         4   4.7  68.7  0.03  0.19   0 0.963    0   1.4