 Run 65390 Event16199   ATA.CDF.ANA]R65390_E16199.PAD  31DEC94 21:45:10  5-APR-96

                                                                        PHI:
                                                                        ETA:

                                                                               111.
                                                                              -0.42

                                                                              60.8

                                DAIS E transverse Eta-Phi LEGO Plot
                                Max tower E=  60.8 Min tower E=  0.50  N clusters=1
                                  METS: Etotal = 486.8 GeV,   Et(scalar)= 176.7 Ge
                                        Et(miss)=  42.4 at Phi= 224.2 Deg.
                                  CMUO momenta are drawn as green boxes
                                                   CMUO#  qPt Phi0 Eta  Deta
                                                     1   60.8 111 -0.4 -0.6
                                                     2  -55.5 -99 -0.3 -0.4
                                                     3    2.2 141  0.8  0.7

 Cluster Et_min   0.0 GeV
 Clusters:ETHAT CLUSTERING
 $CLP: Cone-size=?, Min Tower Et=?
 EM HA Nr   Et   Phi    Eta  DEta #Tow EM/Et Trks  Mass
        24  50.2  79.1  0.55  0.34   0 0.968    0   2.5
        26  16.0 252.7 -0.89 -1.04   0 0.742    2   1.9
        25  13.6   8.5 -1.24 -1.45   0 0.948    0   1.3
        37  10.8 337.4  0.76  0.57   0 0.831    4   2.4
        39   7.9 309.9  0.86  0.68   0 0.888    6   1.8

   R=  0.4