 Run 67581 Evt 129896   DIL.DST                        17MAR95  1:01:31 10-JUL-00

   Pt   Phi   Eta
 392.5  130  0.78
 -25.2  360  1.15
 -22.6   25  0.30
  18.9  327  0.83
 -12.7  325  1.01
  10.7  329  0.86
  -8.1  328  0.88
  -4.3  331  1.24
  -2.3  329  0.95
  -1.7  209  0.41
   1.7  305  1.50
   1.6  254 -1.22
   1.5   18 -0.66
  -1.4   67  0.98
  -1.4  336  1.41
  -1.4  205  0.76
   1.2  317  1.14
  -1.1  293  1.00
  -0.9  123 -0.50
  -0.9  146 -1.02
  -0.8  296  0.34
   0.8  328 -0.30
   0.7  168 -0.98
   0.7  201  0.00
   0.6  232  0.11
   0.6  168 -0.55
  -0.5  116  1.19
   0.5  283 -0.85
  -0.5   67 -0.15
   0.5  254 -0.64
   0.5   53  0.27
  -0.5  243     2d
  -0.5  140 -0.86
   0.5  354  1.21
 14 more trks...
 hit & to display PHI:

                                                                        ETA:

                                                                               130.

                                                                               0.78

                                                              Emax =  245.7 GeV

                   Et(METS)= 111.0 GeV

                   /
                       Phi = 290.6 Deg
                    Sum Et = 369.1 GeV