 Run 67581 Evt 129896   DIL.DST                        17MAR95  1:01:31 10-JUL-00

                                                                        PHI:

                                                                        ETA:

                                                                               239.

                                                                               0.78

                                                                             182.9

                                DAIS E transverse Eta-Phi LEGO Plot
                                Max tower E= 182.9 Min tower E=  0.20  N clusters=

                                  METS: Etotal =1252.5 GeV,   Et(scalar)= 369.1 Ge
                                        Et(miss)= 111.0 at Phi= 290.6 Deg.
                                  CMUO momenta are drawn as green boxes
                                                   CMUO#  qPt Phi0 Eta  Deta
                                                     1  -22.6  25  0.3  0.1

 Cluster Et_min   0.0 GeV

 Clusters:ETHAT CLUSTERING
 $CLP: Cone-size= 0.7, Min Tower Et=  0.1
 EM HA Nr   Et   Phi    Eta  DEta #Tow EM/Et Trks  Mass
         1 185.8 130.7  0.77  0.56   9 0.991    1   6.1
         3  98.5 335.5  1.00  0.79  33 0.789    7  31.7
         7   7.0 113.4 -2.78 -2.78  26 0.378    0   2.9
        10   6.5 173.1 -2.20 -2.33  24 0.443    0   2.4
        11   5.7 314.8 -2.71 -2.74  26 0.808    0   2.0

      CLF:  ETEM/ETTOT/ORG/NTW/PT
             0.0/  4.5/CLF/  1
            76.0/ 96.5/CLF/  8
           127.0/128.5/CLF/  1