 Run 68739 Evt 257646   A.CDF.ANA]R68739_257646.DST;1  28APR95 22:41:20 12-DEC-95

                                                                        PHI:
                                                                        ETA:

                                                                               162.
                                                                               0.57

                                                                              52.3

                                DAIS E transverse Eta-Phi LEGO Plot
                                Max tower E=  52.3 Min tower E=  0.50  N clusters=
                                  METS: Etotal =1194.5 GeV,   Et(scalar)= 267.7 Ge
                                        Et(miss)=  52.8 at Phi= 167.2 Deg.

 Cluster Et_min   0.0 GeV
 Clusters:ETHAT CLUSTERING
 $CLP: Cone-size= 0.7, Min Tower Et=  0.1
 EM HA Nr   Et   Phi    Eta  DEta #Tow EM/Et Trks  Mass
         1  64.4  17.3 -1.72 -1.62  33 0.938    0   8.2
         2  41.7 331.0 -0.86 -0.78  16 0.975    2   4.8
         3  38.3 161.6  0.58  0.66   8 0.974    1   3.8
         4  33.6 244.8 -0.64 -0.55  11 0.956    1   5.4
         8  12.0  94.3  1.64  1.62  46 0.433    0   5.9

   R=  0.4